From 7bf2eb8ba09b54cec804446ea39a3e658773fac9 Mon Sep 17 00:00:00 2001
From: Pierre Schmitz <pierre@archlinux.de>
Date: Sat, 21 May 2016 08:33:14 +0200
Subject: Update to MediaWiki 1.26.3

---
 README.mediawiki | 1 -
 1 file changed, 1 deletion(-)
 delete mode 120000 README.mediawiki

(limited to 'README.mediawiki')

diff --git a/README.mediawiki b/README.mediawiki
deleted file mode 120000
index 100b9382..00000000
--- a/README.mediawiki
+++ /dev/null
@@ -1 +0,0 @@
-README
\ No newline at end of file
-- 
cgit v1.2.2

